<template>
  <div class="deviceStatistics card">
    <div class="card-head">
      <div class="title">内容数据</div>
      <div class="condition">
        <el-button-group>
          <el-button type="primary">心率</el-button>
          <el-button>血氧</el-button>
          <el-button>体表温度</el-button>
        </el-button-group>
        <div class="condition-time">
          <el-date-picker
            style="width: 350px"
            v-model="value1"
            type="datetimerange"
            start-placeholder="Start date"
            end-placeholder="End date"
            format="YYYY-MM-DD HH:mm:ss"
            date-format="YYYY/MM/DD ddd"
            time-format="A hh:mm:ss"
          />
        </div>
      </div>
    </div>
    <slot name="chart"></slot>
  </div>
</template>
<script setup>
import { ref } from "vue";
const value1 = ref("");
</script>
<style scoped lang="less">
.card {
  height: 100%;
  background: #ffffff;
  padding: 16px 10px;
  box-sizing: border-box;
  overflow: hidden;
  display: flex;
  flex-direction: column;
  .card-head {
    color: #061451;
    font-size: 20px;
    display: flex;
    align-items: center;
    justify-content: space-between;
    .title {
      &::before {
        display: inline-block;
        margin-right: 10px;
        content: "";
        width: 2px;
        height: 14px;
        border-radius: 20px;
        background: #061451;
      }
    }
    .condition {
      display: flex;
      align-items: center;
      margin-left: 20px;
      .condition-time {
        overflow: hidden;
        margin-left: 20px;
      }
    }
  }
}
</style>
